0 14.3 28.6 42.9 57.1 71.4 85.7 0

0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

0.09

ICI-ICI(full moon), sec lunar phase, % from full

The mean number of ICI (the ICI at full moon is taken as a baseline)