ICI,sec lunar phase, % from full

Distribution of ICI in dependance on lunar phase

0.1 0.3 0.4 0.6 0.7 0.9 1 1.2

0

10

30

40

60

70

90

100 0

0.02

0.04

0.06

0.08

0.1

0.12