channel

Demonstration of CMT algo for NOURAGUES MNHN spectrum, time in sec

0 1 2 3 4 5 6 100 200 300 400 500

-8 -6 -4 -2 0

0 100 200 300 400 500 600 0

0.5

1 variation by channel on spectro no CMT

scalogram no CMT, time in sec

0 1 2 3 4 5 6 20 40 60 80 100 120

0.2 0.4 0.6 0.8 1

0 500 1000 1500 2000 2500 0 50 100 150

variat variation on map between 2 iterations

scalogram with CMT, time in sec

0 1 2 3 4 5 6 20 40 60 80 100 120

0 0.2 0.4 0.6 0.8

0 20 40 60 80 100 120 140 0 0.5 1 1.5 Id. of the tracks (dashed red = without CMT , blue = with CMT)