spectrum

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8

100 200 300 400 500 -10 -5 0

0 100 200 300 400 500 600 0

0.5

1 variation by channel

time in sec channel scalogram

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8

20 40 60 80 100 0 0.5

1

0 100 200 300 400 500 600 0 50 100 150

variat iteration

time in sec

CMT

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8

20 40 60 80 100 0 0.2 0.4 0.6 0.8

0 20 40 60 80 100 120 0

0.1

0.2 variation by channel